import { redirect } from "next/navigation"

export default async function ProjectDocuListRulePage({
  params,
}: {
  params: Promise<{ lng: string; projectId: string }>
}) {
  const { lng, projectId } = await params
  redirect(`/${lng}/evcp/docu-list-rule/${projectId}/document-class`)
}
